0 10 20 30 40 50 60 70 80 90 100 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 M = 20, T = 5

Burst Length (B)

Rate (R)

Optimal Codes

SCo Codes

MDP Codes