0 0.001 0.002 0.003 0.004 0.005 0.006 0.007 0.008 0.009 0.01

10^{-5}

10^{-4}

10^{-3}

10^{-2}

ε

PLoss

Gilbert - Elliott Channel - (α,β) = (10^{-5} ,0.1) - T = 8

Uncoded Optimal Robust Code MDP SCo